sp0305+261 sdF sp0946+139 sdF sp0644+375 DA sp1045+378 O9V

NOT+ALFOSC+CCD#7 efficiency for grisms #6, #7, #8 with 10 arcsec wide slit

note the second order effect in Gr#7 for blue stars

3000 4000 5000 6000 7000 8000 0

10

20

30

wavelength